-- 2023-05-05 ysj
-- xmiot 库
CREATE TABLE `iot_statistics_realtime` (
                                           `id` varchar(50) NOT NULL,
                                           `type` varchar(50) DEFAULT NULL,
                                           `device_num` varchar(20) DEFAULT NULL COMMENT '设备数据',
                                           `sign_num` varchar(20) DEFAULT NULL COMMENT '体征数据',
                                           `abnormal_num` varchar(20) DEFAULT NULL COMMENT '异常数据',
                                           `create_time` datetime DEFAULT NULL,
                                           PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='大屏-统计-实时数据';



-- 数据库 device
ALTER TABLE wlyy_patient_device_location ADD city varchar(20) COMMENT '城市' ;
ALTER TABLE wlyy_patient_device_location ADD city_name varchar(20) COMMENT '城市名称' ;
ALTER TABLE wlyy_patient_device_location ADD town varchar(20) COMMENT '地区' ;
ALTER TABLE wlyy_patient_device_location ADD town_name varchar(20) COMMENT '地区名称' ;

ALTER TABLE wlyy_knowledge_article_dict ADD url varchar(500) COMMENT '外链地址' ;



---宣教
ALTER TABLE base_doctor_role ADD del tinyint(1) DEFAULT '1' COMMENT '是否生效 1生效 0失效' ;
ALTER TABLE base_menu_dict ADD  type tinyint(2) DEFAULT NULL COMMENT '类型 1 官网菜单 2app文章菜单' ;
ALTER TABLE wlyy_knowledge_article_dict ADD type tinyint(1) DEFAULT '1' COMMENT '类型 1官网 2app文章';
ALTER TABLE wlyy_knowledge_article_dict ADD comment int(11) DEFAULT NULL COMMENT '评论数量';
ALTER TABLE wlyy_knowledge_article_dict ADD puplish_type int(11) DEFAULT NULL COMMENT '1、图文2、视频3、音频';
ALTER TABLE wlyy_knowledge_article_dict ADD recommend_doctor varchar(1000) DEFAULT NULL;
ALTER TABLE wlyy_knowledge_article_dict ADD puplish_type_name varchar(255) DEFAULT NULL COMMENT '发布类型名称：1、图文2、视频3、音频';
ALTER TABLE wlyy_knowledge_article_dict ADD recommend_doctor_name varchar(1000) CHARACTER SET utf8 DEFAULT NULL COMMENT '推荐医生名字';