INSERT INTO `base`.`dm_device` (`id`, `category_code`, `photo`, `brands`, `model`, `name`, `is_multi_user`, `multi_user`, `czrq`, `del`, `service_topic`, `need_register`, `device_type`) VALUES ('53', '14', 'group1/M00/00/7D/rBoAbmJM_ImAIpVJAAEHObqvlCc406.png', '赛特', 'JT-GS894-C', '燃气泄漏监测', '1', NULL, '2024-04-18 17:39:36', '1', 'preventGasLeakage', NULL, '1');
INSERT INTO `base`.`dm_device` (`id`, `category_code`, `photo`, `brands`, `model`, `name`, `is_multi_user`, `multi_user`, `czrq`, `del`, `service_topic`, `need_register`, `device_type`) VALUES ('54', '15', 'group1/M00/00/5B/rBoAb2JM_I6AOxbPAAF-iVueMbM661.png', '赛特', 'GS524N', '火灾监测', '1', NULL, '2024-04-18 17:39:36', '1', 'preventFire', NULL, '1');
