-- 2023-05-05 ysj
-- xmiot 库
CREATE TABLE `iot_statistics_realtime` (
     `id` varchar(50) NOT NULL,
     `type` varchar(50) DEFAULT NULL,
     `device_num` varchar(20) DEFAULT NULL COMMENT '设备数据',
     `sign_num` varchar(20) DEFAULT NULL COMMENT '体征数据',
     `abnormal_num` varchar(20) DEFAULT NULL COMMENT '异常数据',
     `create_time` datetime DEFAULT NULL,
     PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='大屏-统计-实时数据';



-- 数据库 device
ALTER TABLE wlyy_patient_device_location ADD city varchar(20) COMMENT '城市' ;
ALTER TABLE wlyy_patient_device_location ADD city_name varchar(20) COMMENT '城市名称' ;
ALTER TABLE wlyy_patient_device_location ADD town varchar(20) COMMENT '地区' ;
ALTER TABLE wlyy_patient_device_location ADD town_name varchar(20) COMMENT '地区名称' ;

ALTER TABLE wlyy_knowledge_article_dict ADD url varchar(500) COMMENT '外链地址' ;
