/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;
/*!40014 SET @OLD_FOREIGN_KEY_CHECKS=@@FOREIGN_KEY_CHECKS, FOREIGN_KEY_CHECKS=0 */;
/*!40101 SET @OLD_SQL_MODE=@@SQL_MODE, SQL_MODE='NO_AUTO_VALUE_ON_ZERO' */;
/*!40111 SET @OLD_SQL_NOTES=@@SQL_NOTES, SQL_NOTES=0 */;

# Create Database
# ------------------------------------------------------------
CREATE DATABASE IF NOT EXISTS ProdApolloConfigDB DEFAULT CHARACTER SET = utf8mb4;

Use ProdApolloConfigDB;

# Dump of table app
# ------------------------------------------------------------

DROP TABLE IF EXISTS `App`;

CREATE TABLE `App` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键',
  `AppId` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `Name` varchar(500) NOT NULL DEFAULT 'default' COMMENT '应用名',
  `OrgId` varchar(32) NOT NULL DEFAULT 'default' COMMENT '部门Id',
  `OrgName` varchar(64) NOT NULL DEFAULT 'default' COMMENT '部门名字',
  `OwnerName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'ownerName',
  `OwnerEmail` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'ownerEmail',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `AppId` (`AppId`(191)),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_Name` (`Name`(191))
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='应用表';



# Dump of table appnamespace
# ------------------------------------------------------------

DROP TABLE IF EXISTS `AppNamespace`;

CREATE TABLE `AppNamespace` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `Name` varchar(32) NOT NULL DEFAULT '' COMMENT 'namespace名字，注意，需要全局唯一',
  `AppId` varchar(32) NOT NULL DEFAULT '' COMMENT 'app id',
  `Format` varchar(32) NOT NULL DEFAULT 'properties' COMMENT 'namespace的format类型',
  `IsPublic` bit(1) NOT NULL DEFAULT b'0' COMMENT 'namespace是否为公共',
  `Comment` varchar(64) NOT NULL DEFAULT '' COMMENT '注释',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `IX_AppId` (`AppId`),
  KEY `Name_AppId` (`Name`,`AppId`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='应用namespace定义';



# Dump of table audit
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Audit`;

CREATE TABLE `Audit` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键',
  `EntityName` varchar(50) NOT NULL DEFAULT 'default' COMMENT '表名',
  `EntityId` int(10) unsigned DEFAULT NULL COMMENT '记录ID',
  `OpName` varchar(50) NOT NULL DEFAULT 'default' COMMENT '操作类型',
  `Comment` varchar(500) DEFAULT NULL COMMENT '备注',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='日志审计表';



# Dump of table cluster
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Cluster`;

CREATE TABLE `Cluster` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `Name` varchar(32) NOT NULL DEFAULT '' COMMENT '集群名字',
  `AppId` varchar(32) NOT NULL DEFAULT '' COMMENT 'App id',
  `ParentClusterId` int(10) unsigned NOT NULL DEFAULT '0' COMMENT '父cluster',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `IX_AppId_Name` (`AppId`,`Name`),
  KEY `IX_ParentClusterId` (`ParentClusterId`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='集群';



# Dump of table commit
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Commit`;

CREATE TABLE `Commit` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键',
  `ChangeSets` longtext NOT NULL COMMENT '修改变更集',
  `AppId` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'ClusterName',
  `NamespaceName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'namespaceName',
  `Comment` varchar(500) DEFAULT NULL COMMENT '备注',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `AppId` (`AppId`(191)),
  KEY `ClusterName` (`ClusterName`(191)),
  KEY `NamespaceName` (`NamespaceName`(191))
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='commit 历史表';

# Dump of table grayreleaserule
# ------------------------------------------------------------

DROP TABLE IF EXISTS `GrayReleaseRule`;

CREATE TABLE `GrayReleaseRule` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键',
  `AppId` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'Cluster Name',
  `NamespaceName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'Namespace Name',
  `BranchName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'branch name',
  `Rules` varchar(16000) DEFAULT '[]' COMMENT '灰度规则',
  `ReleaseId` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '灰度对应的release',
  `BranchStatus` tinyint(2) DEFAULT '1' COMMENT '灰度分支状态: 0:删除分支,1:正在使用的规则 2：全量发布',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_Namespace` (`AppId`,`ClusterName`,`NamespaceName`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='灰度规则表';


# Dump of table instance
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Instance`;

CREATE TABLE `Instance` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增Id',
  `AppId` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'ClusterName',
  `DataCenter` varchar(64) NOT NULL DEFAULT 'default' COMMENT 'Data Center Name',
  `Ip` varchar(32) NOT NULL DEFAULT '' COMMENT 'instance ip',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  UNIQUE KEY `IX_UNIQUE_KEY` (`AppId`,`ClusterName`,`Ip`,`DataCenter`),
  KEY `IX_IP` (`Ip`),
  KEY `IX_DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='使用配置的应用实例';



# Dump of table instanceconfig
# ------------------------------------------------------------

DROP TABLE IF EXISTS `InstanceConfig`;

CREATE TABLE `InstanceConfig` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增Id',
  `InstanceId` int(11) unsigned DEFAULT NULL COMMENT 'Instance Id',
  `ConfigAppId` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'Config App Id',
  `ConfigClusterName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'Config Cluster Name',
  `ConfigNamespaceName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'Config Namespace Name',
  `ReleaseKey` varchar(64) NOT NULL DEFAULT '' COMMENT '发布的Key',
  `ReleaseDeliveryTime` timestamp NULL DEFAULT NULL COMMENT '配置获取时间',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  UNIQUE KEY `IX_UNIQUE_KEY` (`InstanceId`,`ConfigAppId`,`ConfigNamespaceName`),
  KEY `IX_ReleaseKey` (`ReleaseKey`),
  KEY `IX_DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_Valid_Namespace` (`ConfigAppId`,`ConfigClusterName`,`ConfigNamespaceName`,`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='应用实例的配置信息';



# Dump of table item
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Item`;

CREATE TABLE `Item` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增Id',
  `NamespaceId` int(10) unsigned NOT NULL DEFAULT '0' COMMENT '集群NamespaceId',
  `Key` varchar(128) NOT NULL DEFAULT 'default' COMMENT '配置项Key',
  `Value` longtext NOT NULL COMMENT '配置项值',
  `Comment` varchar(1024) DEFAULT '' COMMENT '注释',
  `LineNum` int(10) unsigned DEFAULT '0' COMMENT '行号',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `IX_GroupId` (`NamespaceId`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='配置项目';



# Dump of table namespace
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Namespace`;

CREATE TABLE `Namespace` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `AppId` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'Cluster Name',
  `NamespaceName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'Namespace Name',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `AppId_ClusterName_NamespaceName` (`AppId`(191),`ClusterName`(191),`NamespaceName`(191)),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_NamespaceName` (`NamespaceName`(191))
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='命名空间';



# Dump of table namespacelock
# ------------------------------------------------------------

DROP TABLE IF EXISTS `NamespaceLock`;

CREATE TABLE `NamespaceLock` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增id',
  `NamespaceId` int(10) unsigned NOT NULL DEFAULT '0' COMMENT '集群NamespaceId',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT 'default' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  `IsDeleted` bit(1) DEFAULT b'0' COMMENT '软删除',
  PRIMARY KEY (`Id`),
  UNIQUE KEY `IX_NamespaceId` (`NamespaceId`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='namespace的编辑锁';



# Dump of table release
# ------------------------------------------------------------

DROP TABLE IF EXISTS `Release`;

CREATE TABLE `Release` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `ReleaseKey` varchar(64) NOT NULL DEFAULT '' COMMENT '发布的Key',
  `Name` varchar(64) NOT NULL DEFAULT 'default' COMMENT '发布名字',
  `Comment` varchar(256) DEFAULT NULL COMMENT '发布说明',
  `AppId` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'ClusterName',
  `NamespaceName` varchar(500) NOT NULL DEFAULT 'default' COMMENT 'namespaceName',
  `Configurations` longtext NOT NULL COMMENT '发布配置',
  `IsAbandoned` bit(1) NOT NULL DEFAULT b'0' COMMENT '是否废弃',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `AppId_ClusterName_GroupName` (`AppId`(191),`ClusterName`(191),`NamespaceName`(191)),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_ReleaseKey` (`ReleaseKey`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='发布';


# Dump of table releasehistory
# ------------------------------------------------------------

DROP TABLE IF EXISTS `ReleaseHistory`;

CREATE TABLE `ReleaseHistory` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增Id',
  `AppId` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'AppID',
  `ClusterName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'ClusterName',
  `NamespaceName` varchar(32) NOT NULL DEFAULT 'default' COMMENT 'namespaceName',
  `BranchName` varchar(32) NOT NULL DEFAULT 'default' COMMENT '发布分支名',
  `ReleaseId` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '关联的Release Id',
  `PreviousReleaseId` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '前一次发布的ReleaseId',
  `Operation` tinyint(3) unsigned NOT NULL DEFAULT '0' COMMENT '发布类型，0: 普通发布，1: 回滚，2: 灰度发布，3: 灰度规则更新，4: 灰度合并回主分支发布，5: 主分支发布灰度自动发布，6: 主分支回滚灰度自动发布，7: 放弃灰度',
  `OperationContext` longtext NOT NULL COMMENT '发布上下文信息',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `IX_Namespace` (`AppId`,`ClusterName`,`NamespaceName`,`BranchName`),
  KEY `IX_ReleaseId` (`ReleaseId`),
  KEY `IX_DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='发布历史';


# Dump of table releasemessage
# ------------------------------------------------------------

DROP TABLE IF EXISTS `ReleaseMessage`;

CREATE TABLE `ReleaseMessage` (
  `Id` int(11) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增主键',
  `Message` varchar(1024) NOT NULL DEFAULT '' COMMENT '发布的消息内容',
  `DataChange_LastTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`),
  KEY `IX_Message` (`Message`(191))
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='发布消息';



# Dump of table serverconfig
# ------------------------------------------------------------

DROP TABLE IF EXISTS `ServerConfig`;

CREATE TABLE `ServerConfig` (
  `Id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增Id',
  `Key` varchar(64) NOT NULL DEFAULT 'default' COMMENT '配置项Key',
  `Cluster` varchar(32) NOT NULL DEFAULT 'default' COMMENT '配置对应的集群，default为不针对特定的集群',
  `Value` varchar(2048) NOT NULL DEFAULT 'default' COMMENT '配置项值',
  `Comment` varchar(1024) DEFAULT '' COMMENT '注释',
  `IsDeleted` bit(1) NOT NULL DEFAULT b'0' COMMENT '1: deleted, 0: normal',
  `DataChange_CreatedBy` varchar(32) NOT NULL DEFAULT 'default' COMMENT '创建人邮箱前缀',
  `DataChange_CreatedTime` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `DataChange_LastModifiedBy` varchar(32) DEFAULT '' COMMENT '最后修改人邮箱前缀',
  `DataChange_LastTime` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '最后修改时间',
  PRIMARY KEY (`Id`),
  KEY `IX_Key` (`Key`),
  KEY `DataChange_LastTime` (`DataChange_LastTime`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='配置服务自身配置';

# Config
# ------------------------------------------------------------
INSERT INTO `ServerConfig` (`Key`, `Cluster`, `Value`, `Comment`)
VALUES
    ('eureka.service.url', 'default', 'http://statefulset-apollo-config-server-prod-0.service-apollo-meta-server-prod:8080/eureka/,http://statefulset-apollo-config-server-prod-1.service-apollo-meta-server-prod:8080/eureka/,http://statefulset-apollo-config-server-prod-2.service-apollo-meta-server-prod:8080/eureka/', 'Eureka服务Url，多个service以英文逗号分隔'),
    ('namespace.lock.switch', 'default', 'false', '一次发布只能有一个人修改开关'),
    ('item.key.length.limit', 'default', '128', 'item key 最大长度限制'),
    ('item.value.length.limit', 'default', '20000', 'item value最大长度限制'),
    ('config-service.cache.enabled', 'default', 'false', 'ConfigService是否开启缓存，开启后能提高性能，但是会增大内存消耗！');

/*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;
/*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
/*!40014 SET FOREIGN_KEY_CHECKS=@OLD_FOREIGN_KEY_CHECKS */;
/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
